Ifor Williams SPX/Fenner Tipper Solenoid Partcode: P119714

Ifor Williams Tipper Solenoid

Fits SPX/Fenner Hydraulic power pack

Partcode: P119714

Fitted on TT85 Tipping trailers pre 10/12/2006 & TT105 & TT126 Tipping Trailers pre 19/03/2007

The post Ifor Williams SPX/Fenner Tipper Solenoid Partcode: P119714 appeared first on Tuer Trailers.